-6 -4 -2 2 4 6 8

                                   -1000

                                    -750

                                    -500

                                    -250

                                     250

                                     500

                                     750

                                    1000

                   d200c0s0-d0c0s0 total DOS

        Ef

        d200c0s0-d0c0s0